EagleWiz Silver Double Heart Tealight Holder

EagleWiz Silver Double Heart Tealight Holder:

The hearts are made of ceramic with a beautiful chrome finish. The product has 4 raised pads underneath to prevent scratching on the surface. Candle holder diameter is 5cm. Measurements: W14.5cm x D6.5cm x H14cm. The footprint is 6.5cm x 6.5cm. SKU: CH5966

The post EagleWiz Silver Double Heart Tealight Holder appeared first on EagleWiz.